\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 300 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{21}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & GC (\%) & N50 & N75 & L50 & L75 & \# N's per 100 kbp \\ \hline
virus\_suspected\_contig\_filtered & 24 & 21 & 18 & 15 & 11 & 6 & 1107693 & 1106318 & 1100205 & 1078623 & 1013636 & 792702 & 24 & 350340 & 1107693 & 66.28 & 91945 & 49570 & 3 & 7 & 0.00 \\ \hline
virus\_confirmed\_contig\_filtered & 31 & 29 & 27 & 25 & 24 & 24 & 5935438 & 5933650 & 5927329 & 5914866 & 5891818 & 5891818 & 31 & 559411 & 5935438 & 66.24 & 351384 & 184856 & 7 & 13 & 0.00 \\ \hline
virus\_denovo\_contig\_filtered & 97 & 72 & 50 & 43 & 38 & 31 & 7246198 & 7230620 & 7178316 & 7132680 & 7044645 & 6742390 & 97 & 559411 & 7246198 & 66.19 & 296862 & 141901 & 9 & 18 & 0.00 \\ \hline
combined\_contig & 97 & 72 & 50 & 43 & 38 & 31 & 7246198 & 7230620 & 7178316 & 7132680 & 7044645 & 6742390 & 97 & 559411 & 7246198 & 66.19 & 296862 & 141901 & 9 & 18 & 0.00 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
